\chapter{Installation}\label{installation}\index{Installation}%
\setheader{{\it CHAPTER \thechapter}}{}{}{}{}{{\it CHAPTER \thechapter}}%
\setfooter{\thepage}{}{}{}{\small Manual v0.2}{\thepage}%

\section{Download}\label{download}\index{Installation,Download}%

The latest version of \ctsim, plus source code, can be accessed from:

\begin{verbatim}
http://www.ctsim.org
ftp://ftp.ctsim.org
\end{verbatim}

\section{Installing Windows Binary}\index{Installation,Windows}%

Download the Windows executable file as helprefn{shown}{download}.
Simply execute this program to unpack \ctsim\ and begin the
installation program. \ctsim\ will then be accessible from the
\texttt{Start} Menu under the \texttt{Programs} submenu.

\ctsim\ is compatible with Windows 98, Windows Me, Windows NT 4.0,
and Windows 2000. Due to use of the OpenGL and htmlhelp libraries,
\ctsim\ is not compatible with the stock Windows 95 system.

\section{Installing Linux RPM}\index{Installation,Linux}%
Download the RPM file from as \helprefn{shown}{download}. Then use
the \texttt{rpm} manager program:\\
\hspace{1cm}\texttt{rpm -Uvh} \emph{ctsim-*.rpm}\\

\ctsim will then be installed in the \texttt{/usr/local/bin}
directory.

\section{Build From Sources}\label{build}\index{Installation,Build}%

Refer to the INSTALL file included in the source distribution for
instructions.

\subsection{Optional Libraries When Building For Source}%
  \begin{itemize}
  \item zlib Library\\
        Used for PNG file export.

  \item libpng Library)\\
        Used for PNG file export.\\
    www.libpng.org

  \item FFTW library)\\
    Used for frequency-based filtering and fourier transformations of images.\\
    www.fftw.org

  \item readline library\\
    Used for \ctsimtext\ interactive shell.

  \item wxWindows library\\
  Used for platform-independent graphical interface. The graphical-shell
  program \ctsim\ requires this library.\\
  www.wxwindows.org

  \item dmalloc library\\
    Used for debugging memory allocation\\
    www.dmalloc.com

\end{itemize}
